rise time (average-subtracted) [ns]

-30 -20 -10 0 10 20 30 pulse height (normalized)

-1.3

-1.2

-1.1 -1 -0.9

-0.8

-0.7

-0.6

Pulse height versus rise time (peak inversion on) FNAL UCSB